√ s = 10 GeV

√ s = 4 GeV √ s = 1 GeV e^+e^− → π^+π^−γ(γ)

√ Q^2 GeV

dσ(NLO_{mass}) d √_{Q2} /^{dσ}_d√_{Q2}

2.5 2 1.5 1 0.5 0

0 −0.0002 −0.0004 −0.0006 −0.0008 −0.001 −0.0012 −0.0014 −0.0016 −0.0018