0

0.1

0.2

0.3

0.4

0.5

0.6

0 10 20 30 40 50 60 70 sqrt(s)=14 TeV, M_H=150 GeV, CTEQ5M

LL NLL NNLL, H scheme NNLL, MS-bar scheme NNLL, Collinear scheme

Q_T (GeV) d σ / d Q_T (pb/GeV)