0.0 0.4 0.8 1.2 1.6 ρ 0.0

0.2

0.4

0.6

0.8

1.0

z a)

-1 0 1 r 0.0

0.5

1.0

1.5

2.0

2.5

Scaled Energy

F(r) x 10, R = 0.7 E_C(r), R = 0.7

σ = 0 b)