%Title: Measurement of neutron detection efficiencies in NaI using the Crystal Ball detector
%Author: T.D.S. Stanislaus, Hans-Martin Staudenmaier &amp; al.
%Published: <EM>Nucl. Instrum. Meth.</EM> <B>A 462</B> (2001) 463-473.
