%Title: Determination of the Quadratic Slope Parameter in eta to 3 pi0 Decay
%Author: W. B. Tippens, Hans-Martin Staudenmaier &amp; al.
%Published: <EM>Phys. Rev. Lett.</EM> <B>87</B> (2001) 192001.
