-200

-100

0

100

0 0.2 0.4 0.6 0.8 1 x δ^{-1} xP^{(2)}(x)

approx.

s qγ,1

x δ^{-1} xP^{(2)}(x)

approx.

s gγ,1

-200

-100

0

100

200

0 0.2 0.4 0.6 0.8 1