-0.005 0 0.005

0.01

0.015

0.02

0.025

0.03

0.035

0.04

-0.6 -0.4 -0.2 0 0.2 0.4 0.6

√s = 6 GeV r^{(v)}_{c,2}

log(μ/√s)

α_s^0 α_s^1 α_s^2 α_s^3